<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% This file is part of the CTAN package named plain-widow.
% 
%   pxwmanual.tex: add manual \vsize change to pxwreport.tex
%   Version 1.0, 13.05.2025
%
%   Copyright (C) 2025  Udo Wermuth (author)
%
%   This program is free software: you can redistribute it and/or modify
%   it under the terms of the GNU General Public License as published by
%   the Free Software Foundation, either version 3 of the License, or
%   (at your option) any later version.
%
%   This program is distributed in the hope that it will be useful,
%   but WITHOUT ANY WARRANTY; without even the implied warranty of
%   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
%   GNU General Public License for more details.
%
%   You should have received a copy of the GNU General Public License
%   along with this program.  If not, see &lt;http://www.gnu.org/licenses/&gt;.
%
\input pxwreport.tex
% code from single.tex with ``SINGLE'' replaced by ``MANUAL''
\def\footlinedist{30pt }%plain TeX's value: 24pt
\def\makefootline{\baselineskip=\footlinedist
 \lineskiplimit=0pt\line{\the\footline}}
\begingroup \dimen255=\footlinedist
 \gdef\PXnormaldist{\gdef\footlinedist{30 pt}}
 \advance\dimen255 by +1\baselineskip
 \xdef\PXplusdist{\noexpand\gdef\noexpand
  \footlinedist{\the\dimen255 }}
 \advance\dimen255 by -2\baselineskip
 \xdef\PXminusdist{\noexpand\gdef\noexpand
  \footlinedist{\the\dimen255 }}\endgroup
\def\PXincVsize{% increase \vsize by one line
 \global\advance\vsize by +1\baselineskip
 \PXminusdist\wlog{MANUAL: \vsize + 1 line}}
\def\PXdecVsize{% decrease \vsize by one line
 \global\advance\vsize by -1\baselineskip
 \PXplusdist\wlog{MANUAL: \vsize - 1 line}}
\def\PXresetVsize{% reset \vsize to former value
 \ifdim\vsize=\PXsaveVsize \else \PXnormaldist
  \global\vsize=\PXsaveVsize \fi}
\def\PXstorevsize{\edef\PXsaveVsize{\the\vsize}}
\PXstorevsize % call this if \vsize is changed
%
% put the following macros into \def\PXpostoutput
\def\PXplus(#1){% #1: page number; now +1 line
 \ifnum#1=\pageno \PXresetVsize \PXincVsize
 \fi \ignorespaces}
\def\PXminus(#1){% #1: page number; now -1 line
 \ifnum#1=\pageno \PXresetVsize \PXdecVsize
 \fi \ignorespaces}
\def\PXstop(#1){% #1: page number; now no change
 \ifnum#1=\pageno \PXresetVsize
  \wlog{MANUAL: \vsize}\fi \ignorespaces}
</pre></body></html>